B.S fhe Prob Lems

NX Lewes evident j wordt att Che OF? Conite tiat\the pedust risa oroge velrbew baad retre thie ore tee While Nae Comnadl cee 's fica weds to be was Pele i wdenicin tis 8 effective & ufe i S provide pedestrian.

“giittee started be « ote ture Ot crosy nro ti to the Golluwias ehomewut.

L. Non Standard Contrul Devices

There crea numker 9 ( ; aigdfsiygas aud road wcirk in use throughout the fou sstefa Peoviner so. ‘theese ave diffecent standards in usQAeven within the 5 City.

Lo por con rol feuds

drive:

sufacy

Crosswalks depend or painted the vodd and at the side of the road to warn divers of thede Lejsa obligation to step should a pedestrian otep onto the road, Evan assuming that driver iva caurica when warnad by these devices, wuny nmr ius ducing the year vhen this warning wetleacdva, example, the. painted Liacs are ible duc te unos wear oat, ov disanvear cuciny The

ARAN

Ayres ba ai hate Cee RE A ae ey aay “ wey ae A ais Sa bene Pep EERE Sie ON SUR OO Aa het teats Dae gb abl Aon ted toe y 5 at vi

re :

\