THE CORPORATION OF THE CITY CF PORT COQUITLAM

SAUNT BA STEM A

NOV 1 1976

MAYOR AND COUNCIL OCTOBER 28, 1976

PLANNING AND ZONING R#24/76 COMMITTEE

ot aA AOE

Application to rezone a 4,6-acre parcel on 1680 Broadway from 4-1 to M-l for a multi-tenant warehouse development.

Lot 18, D.L. 231 & 288, Plan 4667. DESCRIPTION:

BACKGROUND: The proposed industrial development is expected to be in 3 stages. The initial stage of the development will provide 24,000 sq. ft. of warehouse area, The ultimate development will increase the floor area to 74,400 sq. ft.

About 150 parking spaces are required, but only 118 spaces are shown. There is, however, enough land to meet the parking requirement by redesigning the parking area.

RECOMMENDATION:

This proposed development was dealt with by the Planning and Zoning Committee on October 27th, 1976 and the Committee recommends that the

development be approved,

The Committee, however, wishes to express its concern about the blandness of the design and suggests that it be reviewed by the Design Panel,

a XN _2 L. Lee

Planning Officer.

Liga @ .

EO MS MERE RTOS ee

ARTO oT tinge te, I ap NM Re 8