Cael aiesRetd tacLAtaees OR EU ET Renin

THE CORPORATION OF THE CITY OF PORT COQUITLAM

2272 McALLISTER AVENUE PORT COQUITLAM, B.C.

— “8G ans CO \ N ( |

SEP ~- 9 1974

TELEPHONE: 941.5411

September 9th, 1974

His Worship the Mayor and Aldermen, Corporation of the City of - Port Coquitlam.

Gentlemen:

Re: Work of Local Improvement

In connection with the proposed construction of storm sewers, base reconstruction, concrete curb and gutter, and asphaltic pavement surface on Wellington Street from Coquitlam Avenue to Lincoln Avenue as a work of Local Improvement I am pleased to report as follows:

(a) The lifetime of the work wiil be twenty (20) years: The estimated cost of the work is $375,000.

The share or proportion of the cost which will

be specially charged against the parcels benefiting from or abutting on the work is $6.60 per taxable front-foot in accordance with the provisions of the "Local Improvement Charge By-law, 1969, No. 912"

as amended.

Respectfully submitted,

. ‘Y

V.G. Borch,/P. Eng., City Engineer.