bikers idee

6.1.10.2. each additional sprinkler head; $ 0.85

6.1.10.3. each siamese connection; $18.00

6.1.10.4. each hose cabinet, hose, outlet, wet or dry outlet or standpipe;. $18.00

sanitary piping within a building were no fixtures are involved; 60¢ per metre.

All of the fixtures in Table 4.9.A. of the British Columbia Plumbing Code with the addition of the following are subject to the above fees:

vacuum breaker hydraulic equipment sewage sump oil interceptor grease interceptor gasoline interceptor neutralizer temporary blow off double check assembly

value assembly

No fee for a Plumbing Permit shall. be refunded if the work authorized by the permit has been commenced; but if no work hag been commenced and the permit is surrendered and cancelled the City Treasurer shall refund 90% of the Plumbing Permit Fee; however, no refund shall be made of amounts less than $25.00."

2. This Bylaw may be cited for all purposes as the "Port Coquitlam Building and Plumbing Bylaw, 1991, No. 2568, Amendment Bylaw, 1991, No. 2577".