S

November 28th, 1977. /7.

Moved by Alderman Thompson:

Seconded by Alderman Mabbett:

That the report of the Senior Building Inspector November 28th, 1977 stating street names as suggested by the Street Naming Committee for the Nu-West Corporation Ltd., Cedar Drive Subdivision, Phase I:

Chestnut Street Hickory Drive

Juniper Avenue

Forest Grove

(Cornwall Drive will continue on)

Lombardy Drive Lombardy Place Sumac Place Sitka Avenue

be approved. Carried.

Public Wks. Comn Nov. 28/77 re

pedestrian actuated traffic lights for the Prairie-Flint intersection be Traffic Lights

From the Public Works Committee November 28th, 1977 recommending

; - Prairie & designed and a detailed cost estimate be submitted to Council for approval Flint Intersect. ! - temporary to proceed as soon as possible and that in the meantime School District Adult Patrol.

No. 43 be approached to see if they would consider the establishment of ‘

temporary patrols until the traffic light is operational. i

Moved by Alderman Mabbett: i

Seconded by Alderman Thompson:

That as recommended by the Public Works Committee November 28th, 1977 pedestrian actuated traffic lights for the Prairie-Flint intersection

be designed and a detailed cost estimate be submitted to Council for

approval to proceed as soon as possible; AND THAT in the meantime School District No. 43 be approached to

see if they would consider the establishment of temporary crosswalk patrols

until the traffic light is operational.

Carried.

Prior to passage of the foregoing resolution disc:::sion ensued.

Alderman Traboulay felt adult patrols should be used, but Aldermen Mabbett and Thompson felt school authorities should decide whether adult patrols should be used.

NEW BUSINESS:

Ald. Laking re McDonald's Entrance

Alderman Laking asked when McDonald's parking entrance would be completed and the City Engineer advised the plans are in, but work may

not be completed until next year.

Alderman Laking asked when the meeting with Provincial representatives Ald. Laking re

Mtg. on Floodpin

on the proposed floodplain building level would be held and the City Bldg. Level

Engineer advised that the by-law is now being revised by the Water Rights Branch and will be sent to the City for comment, then a meeting

will be arranged.