Thr CORPORATION OF THE CHY GF PORT COQUITLAM

2272 McALLISTER AVENUE . PORT COQUITLAM. B.C. TELEPHONE: 941.5411 V3C" 2A8

OUR FILE

February 13th, 1978

Mayor and Council, City of Port Coquitlam, 2272 McAllister Avenue, Port Coquitlam, B.C. V3C 2A8

Dear Sirs:

Please accept this letter as notification of my resignation from the position of City Engineer of the City of Port Coquitlam effective Friday, March 31st, 1978.

My six years with Port Coquitlam have been enjoyable, at times exciting, and extremely rewarding. It is with consid- erable sadness that I am tendering my resignation as it will mean the termination of valuable day to day relationships with the staff and Council. These relationships have, I feel, dev- eloped and expanded over the past several years and I will remember them and treasure them.

There are still goals I would like to reach for and Girections to follow in my career and toward this end I will be joining a firm of consulting engineers in Vancouver. It is our family's.intention to continue to reside in Port Coquitlam and we look forward to seeing you from time to time.

Yours truly,

vV.G.

VGB/vw City Engineer. c.c. L.D. Pollock,

City Administrator

R.A. Freeman,

City Clerk

J. Maitland,

City Treasurer