ya an epee ve Cama ete ae,

DRAFT RESOLUTION

"yhat the 1988 Provisional Budget, as presented on December 7th, 1987 in the amount of:

General R@VENUEG. csccesevencvccsepoasp ool p416.00 Water Utility. @eeoereveoneaenoeneaneoocscea 1,089 ,800.00 Sewer Utility. @ooe@esvev0eos OF CGOHHA OBS Ot 1,508 7/700 .00

be adopted.

ys rece