THE CORPORATION OF THE CITY OF PORT COQUITLAM

FOR COMMITTE ONLY

December 17th, 1979

REPORT

TO: Mayor and Council

FROM: Parks & Recreation Committee

Re: Concession Operation

The Committee has been investigating the possible operation of the concession at the Port Rec Centre by City staff. We have looked into the question of alterations for the concession, staffing, hours of operation and equipment require nents.

ALTERATIONS

The Recreation Director has met with Jan MeMitchell (George Pearkes Schocl Cafeteria), Doug Vader (Pantry Restaurant) and former Mayor Jack Campbell to discuss both the physical layout and the operation of the concession.

As a result of these meetings the concession area has been re-designed with the following items included:

More electrical outlets installed.

That a portable island be installed as indicated in the diagram,

°

That a french fryer and grill be installed with 220 wiring.

That food be served from one opening only unless a major function is in process.

The cost of the electrical renovations will be $1,850.00 and the cost of the other structural alterations will be $5,117.00 (which includes the installation of the equipment) for a total cost of $6,967.00.

Continued...