HIGH FIRE KILN

Made in Canada

COAST CERAMICS LTD. own high SSS fire Kiln CC-OT-18 approved by h Canadian Standards Association.

@ 1644” wide by 18” deep @ 4500 watts. 220-230 volts e Three 3-Heat Switches

@ Kanthal A-1 Elements

@ Complete with Stand

@ High Fire 2300°F 1260°C

COMPLETE POTTERS’ SUPPLIES

COAST CERAMICS LIMITED

3739 West 10th Avenue Vancouver 8, B.C.

= oe ee ee ee ee ee ee ee eee ee eee ee ee ee a ee ee ee ea ee eee ee

MEMBERSHIP APPLICATION

I would like to become a member of the B.C. Potters' Guild, NAME

ADDRESS

CITY ZONE

Send cheques plus exchange to Treasurer of the B, C, Potters’ Guild: Mr. Jack Diggle, 1070 West Keith Road,

North Vancouver, B.C. (Membership Fee ~ $3, 00) 16.

4