THE CORPORATION OF THE CITY OF PORT COQUITLAM

B.R. Kirk DATE: August 23, City Administrator

FROM: I.R. Zahynacz, P. Eng. City Engineer

SUBJECT: Installation of New Stop Signs — Fletcher Way (Public Works Committee August 21, 1990)

Recommendations:

That Council approve the installation of stop signs at the following locations:

On Fletcher Way for traffic entering Eastern Drive; On Benneck Way for traffic entering Fletcher Way; On Coutts for traffic entering Fletcher Way from the north;

On Coutts for traffic entering Fletcher Way from the south.

Background & Comments:

The Committee considered the attached report from the Assistant City Engineer regarding stop signs along Fletcher Way and agreed that four new stop signs should be installed at the locations recommended.

IRZ: ge

Attachment