November 30, 1987 /305

REPORTS: PZ /06/87/11/30/18

From the Director of Community Planning, November 25th, 1987 regarding Ben Arnold Town House Proposal ~ Draft Restrictive Covenant.

Moved by Alderman Kery |{uk: Seconded by Alderman Laking:

That City Council approve the draft Restrictive Covenant prepared by the City's Solicitor for registration against the subject property.

Carried. PW/07/87/ 11/30/22

From the City Engineer, November 25th, 1987 regarding Closure of Harbour Street - Public Works Committee November 24th, 1987.

Moved by Alderman Wright: Seconded by Alderman Farnworth:

That Harbour Street be closed at the property line between 1980 Harbour an??1190 Pitt River Road and that the closure be included in the

Traffic Bylaw. Carried.

PW/08/87/11/23

From the City Engineer, November 25th, 1987 regarding Proposed

Category System for Estimates ~ Public Works Committee November 24th, 1987.

Moved by Alderman Wright: Seconded by Alderman Farnworth:

That Council adopt the following category system for an indication of the reliability of future estimates:

CATEGORY A - This will be a detailed estimate based on a fully designed project. The reliability which Council can expect trom this estimate is about plus or minus 10% for small projects, say around $10,000, to

plus or minus 5% on larger projects, say over $200,000.

CATEGORY B - This category would represent preliminary estimates based on preliminary designs, typicaliy the kind that would be prepared before budget approval. Relflability of these estimates would be plus or minus 25% for small projects and plus or minus 15% for large projects.