THE CORPORATION UF ‘THE CITE OF PORE COGUETLAM

B.R. Kirk March 2, 1990 City Administrator File No.: 1/90

Carlos Felip Director of Planning

Application for De-watering facility Referral from Fraser River Harbour Commission

Tt is recommended that the Fraser River Harbour Commission be informed that the Port Coquitlam City Council Supports the application for a water lease submitted by T-Line Canada Limited, to permit a de-watering facility for the Shimizu Sawmill, subject to the facility receiving full approval from the appropriate enviromental agencies.

DISCUSSION:

The proposed water lease and de-watering facility will complement the Shimizu Sawmill, facility that has been Supported by the Municipal Council.

Subject to the applicants Satisfying any concerns that may be expressed by the appropriate environmental agencies, it is recommended that Council advise the Fraser River Harbour Commission that this application is supported by Council.

Ls

Carlos Feliz, Mfr MoC.T.P. Registered Pl irector of Planning

CF/k1l

4/289

EAE A RY

i elidigan