Alderman J. Keryluk

Page 2. June 26, 1975

Occupancy:

Floor Area: Lease Rate:

Right to Sub—Let:

Services Provided:

Parking:

General Specifications:

_ Private offices:

Flooring:

Washrooms:

EBxterior Walls:

Drapes=

Ceiling:

December, 1975 See Appendix "A" attached. See Appendix "A" attached.

The Lessee shall have the right to sublet any portion of the second floor to a tenant or tenants of its choosing.

uoted on a Net Net Net

pasis with theLessee responsible for interior janitorial, lighting, monthly heating, air na other utilities

conditioning, water a together with its pro-rated share of all real

estate taxes.

o be provided current. local

The above rental is q

by Lessor in accordance with by-law requirements.

Basic construction of premises to be provided py Lessor detailing finishes. which can be coordinated to suit Lessor's requirements.

fo be supplied and installed in accordance with Lessee's future requirements to a maximum of 120 feet (lineal feet)

General office area Level loop nylon carpeting or equal, to later detail. Ceramic/Mosaic type tile to both floors and walls, colour coordinated with vanities and w.c. dividers to later detail.

South wall and portion of North wall - two coats of paint, lessee’s choice of colour.

East, West and portion of the North wall - solar bronze plate glass, to later detail.

asement drapes, pleated and and seams, 120% fullness

lus separate sun ares

Acrylic c waghted at all corners with Kirsch draw cords p as required.

Suspended T-Bar system with 2 x 4 acoustical tile.

wooed