October 18th, 1976

Victoria could refuse to grant permission for the development on this basis. The City Engineer advised that he anticipated no problem in obtaining Departmental approval in view of the fact that the area was

within an area with Urban designation on the official Regional Plan.

Moved by Alderman Laking: poring Amend. B/L 1470 -— 3rd rdg.

corer etar esate sete tutnin es

Seconded by Alderman Traboulay:

That By-law No. 1470 be read a third time. Carried.

Moved by Alderman Mabbett: Zoning Amend. B/L #1471 - 3rd rdg.

Seconded by Alderman Laking:

That By-law No. 1471 be read a third time. Carried.

Alderman Ranger voted against the resolution.

Moved by Alderman Laking: ee Amend. B/I - 3 rdg.

Seconded by Alderman Traboulay:

That By~law No. 1472 be read a third time. Carried.

Moved by Alderman Laking: vee Amend -B/L - 3rd rdg.

Seconded by Alderman Mabbett:

That By-law No. 1473 be read a third time. Carried.

Moved by Alderman Ranger: Ulster St.Rd.Clos. B/L#1474-final

passage & adoption

Seconded by Alderman Laking:

That By-law No. 1474 be reconsidered, finally passed and adopted.

i } ¢ Hy i

farried.

Alderman Keryluk introduced a By-law to amend the City's Election

Procedure By-law. Moved by Alderman Keryluk: Election Proced. Amend. B/L#1475 —- ist 3 rdgs.

Seconded by Alderman Mabbett:

That By-law No. 1475 be read a first time. Carried.

Aldermen Laking and Thompson voted against the resolution.

Moved by Alderman Traboulay:

Seconded by Alderman Ranger:

That By-law No. 1475 be read a second time. Carried.

Aldermen Laking and Thompson voted against the resolution.

Moved by Alderman Ranger:

Seconded by Alderman Mabbett:

That By-law No. 1475 be read a third time. Carried.

Aldermen Laking and Thompson voted against the resolution.