ame fad hath

gta wah foe

‘Two days of work last week by public works crews may solve a@ serious flooding problem on Greig Ave. . between Kalum and Atwood. The 1992 budget included $15,000 for a storm sewer connection from the Greig-Atwood: intersection toa drainage ditch to the south. The one- -block section of Greig was under

more than a foot of water on Nov. 28, 1989, and Nov. 15,1991, when heavy rain filled. drainage mains in the area,

Terrace Review — May 15, 1992