On) ake

tt a

bees Me “ ; x wet se hialoda pe Sates te

HOE

DISCUSS ICH: ent conforms with the zoning for the site and, on development, it does conform with the

velopment Permit Area.

The proposed developm

within the li. design guidelines anplicable to t

yitations of a gas stati he Downtown De

The applicant has agreed to modify the free standing sign from an to 8 feet, as recommended in the Design

initially proposed height of 24 feet lity will be improved and so

Guidelines. Access and landscaping to this faci will the general appearance of it. The Planning Department, therefore, can

support this application. 4 ’ } SAO a

Carlos Felip, M-Aychy, M.C.1.P. f Planning

Registere anney, Director o