PAGE B10

— 13-8 we'—| t

g-O'xI'-3" x

6a" 7! c's?"

PTKEAIe

Ten loa

i4-t0"x 23"

‘yY

STATESMAN 6012-3

1 "- 8 3/8°—

9-0" eat

e-e%xe'-7 '[5- a E=--F

No

YS EMBASSY 6612.

- THE N EW a | |

. wednesday, May, 1, 1974

ST a a nT

zat]

r 59". 2". , * ‘ ; . . i | ie dL - . 1-3 3° qos Hes" ‘ d deen

Nn.

eg “gh

7 9"x 8.7"

foo} i2'-e"x11'-3" -

is'-7"ett'-3"

12'-7"% He3"

—11'-8 3/8 ' \ i i ' H ! —

ian >

7:0'x6-5 —————}

peer gts

ra) 00

oO .

DIPLOMAT 62122

19-9" 11-3”

ee ee ee

— “9X65 19.

J iota’ tsa"

: . 15-0" x 1-3" _ |

Iv-8 3/8"

| 10-5" 13" K

ee z/a— | wo we -

wee 52'x24’ Bedroom Raised Kitchen and Dining Room oe aa - % Bathroom a

a | oy f =| DIPLOMAT 6812-3

1, Heavy gauge, coatinuous rooting. >. Fome-cor helps insulate ceiling, x]

10. C.S.A, approved floor uit, 5 14. Prossute tented water tines. 12. Peassute tatted drain lined,

| CS.A. approved Bow Truss on {6 inch centre. . High-quality celing, washable, decorative surlace,

4 tite rated. fog,

5, Urothana appited 1 berttom boerd, celling and exterior walls provkdat | tnuaton, a yapour bartiar and adherion fora more rigidunit, .

6. Calour-bandad, maintensncestses aluminum oladding. ” we

7, G16" sheathing applied 10 studs, continuing through | thm ioists and rool edt.

B, Fire rated Interior pratinithad plywood, . moat

g, Continuous vinyi floor covering, $4 sturdy decking. Glued, malted and gamed to floor una.

13, Durt system provides balanced sle delivery large enough to sccommadate alr ‘gorditioning, . . Boa ateal main mamberl with outelggars ord crorsmariiars ‘aoged and bolted to {hear tro.

ay

g-0'x 1-3"

phe" -3

agaist OE

_ Bedroom or: Oo lent Ferny Rodin:

fa

Raised ‘Kitchen and | - Diting Roam... _ am

: 171-0" 8-6" os

"635.

6251

Dealer ‘Licence Ne. Da5t1a

OBILE HOMES

»

“Terrace B.C...