' ,

’ THE CORPORATICN OF THE CITY OF PORT COQUITLAM

wa COUNCIL

MAY 2.6 1980

Mayor and Council. DATE: May 22, 1980

.

Bullding Protection Committee.

RE: Purchase of Triple Combination Fire Pumper.

Report from Buiiding Protection Committee Meeting held Thursday May 22, 1980. In attendance:

Alderman R. Wright Alderman F. Ranger Fire Chief S. Wingrove Deputy Fire Chief J. N. Bodleau

After comparing specifications, the lowest two tenders, Hub Fire Engine and Equipment Ltd. and Andersons Engineering were considered, Andersons Evgineering specifications meec our requirements and offer aluminum construction verses steel con- struction, Their warranty on the water tank is 15 years. Purchase of the vehicle from Andersons would mean standardization.

Recommendation: The Triple Combination Pumper be purchased from Andersons Engineering st a purchase price of $117,000 tax included.

» S. Wingrove. WSW/mns