For tre instullation of one (1)

LAXCULE] accnvevevecacrssessehessesseesseesses

For the installation of each additional fixture up to ten (1C).ccccccceeve

For the installation of each additional fixture over ten (10)

An number cocecesscecvccnscevunesesensanecsee

For the alteration of plumbing where

no fixtures Are LNVOLVedcocececcsecscscrecsce For the installation of each roof .

drain, deck drain, flocr drain

(storm), catch basin, junction box eeeocsessece

For the installation or renewal of each automatic hot water storage tank (electrical, ges or oil heated) ecsscces

_¥or the installation of fire lineS eseeseesen

For the installation of sprinkler

LINES sescccccscercvcnseeeeeveseneesssesssees

Special Inspections, being inspections made ‘in resconse to a request by a yerscn having a legal interest in establishing the ficness of the plumbing to be inspected, may be made for a fee yer inspection, rayable in advance by the person requesting such inspection of .

For each septic tark installation repair or FENEWAL accccencececerececcssevi see 8.C0-

sewer instellaticn nN

“YJ eavecscvcseescesvaescanseeasvenere 3 4.00

(xii) For each sewer instaliaticen (sterm drainsze) CHOPS SHESOEESESHHSTHERHH CEE HEUSOOEED 4.00 ‘the relocation or removal of fixture(s) above fees are applicable.

the purpose of this eecticn the follewing classified as fixtures and are subject to the abeve fees:

All. of the fixtures in Table 18 with the addition of. the following:

Vacuun breaker Hydraulic equipment Sewage Surp Oil Interceptor Grease Interceptor Gasoline Interceptor Neutralizer

No fee or part thereof in payrent of a Plumting Fermit, as required

by this By-law, shall be refunded if the work authorized by the

frermit has been commenced; but if no work hes been commenced and the

Flumbing Inssector so certifies, the City Treasurer may refund 9Ch%

of the klumbing Fermit Fee; however, no refund shall be made on _amounts of less than 525.CO.