March 16, 1987 / 78

PW/21/87/03/ 16/50 From the City Engineer, March 12th, 1987 regarding Proposed Fee Schedule for Municipal Inspection - Public Works Committee ~ March 12,

1987.

Moved by Alderman Wright: Seconded by Alderman Laking:

That the Fee Schedule attached to the March 12, 1987 report of the City Engineer be approved for use where Developers request the City to do inspections instead of hiring a Consultant Engineer.

Carried.

PW/22/87/03/ 16/52 From the City Engineer, March 12th, 1987 regarding Replacement of

Damaged Gate at Coquitlam River Dyke ~ Public Works Committee ~ March 3, 1987.

Moved by Alderman Wright:

seconded by Alderman Laking:

That the gate damaged by vandalism at the south side of Pitt River Road east of the Coquitlam River be replaced by the City and the estimated cost of about $1,000.00 be taken from uninsured losses.

Carried. CH/23/87/03/ 16/53 From the City Treasurer, February 11th, 1987 regarding Replacement of

Computer System.

Moved by Alderman Wright:

seconded by Alderman Stewart:

That Stevenson Kellogg Ernst and Whinney (SKEW) be retained to assist the City in the replacement of our existing mini-computer system with the costs to come from the City's computer reserve,

Carried.

PZ/24/87/03/ 16/55

From the Director of Community Planning, March 6th, 1987 regarding Community Plan revision 3300 block Ulster, George Pearkes Junior secondary School.

Moved by Alderman Kery luk:

seconded by Alderman Laking:

That the Clerk's Office be directed to prepare a&@ bylaw amending the Official Community Plan revising designation of the southerly 73.152 meters extending 38.1 metres east from Ulster from Institutional to Phase 1 Apartment.

Carried,

ata “