ON

IL YO:

7

L977

SATIN

Ea

cl

HOTELS

SCHOOLS

THEATERS

OTHER BUILOINGS

OTHER INSPECTIONS

HOSPITALS INSTITUTIONS

DANCE, HALLS CABARETS PUBLIC ASSEMBLY

CHIMNEYS

FIRE INVEST- IGATIONS

COMPLAINTS

NOTICES ISSUED

RECHECKS

NO ENTRY

3NITOSV9

TANKS

OIL, BURNERS

NO 135n3

TANKS

COMPRESSED GASSES

DAILY TOTAL

TOTAL TO

NATE

WVILINOOD LYOd

LNAWLYUVd3Sd 3uls