"CITY OF PORT COQUITLAM FIVE YEAR CAPITAL EXPENDITURE PROGRAMME BY-LAW, ‘1972, NO. 1178"

SCHEDULE “a"

PAGE I

PROJECTS

ree

GENERAL GOVERNMENT

City Hall Renovations FIRE DEPARTMENT Traffic Control Signals

PUBLIC WORKS

Local Improvement Projects Road Construction Programme Equipment

Sanitary Sewer

RECREATION

Recreation Facilities

_ $471,000. $244,000.

1972

115,000

100,000 30,000 16,000

130,000

80,000

CITY OF PORT COQUITLAM

“SUMMARY OF 5 YEAR CAPITAL BUDGET

ESTIMATED GROSS COST BY YEARS

1975

——.

100,000 100,000 22,000

TOTAL - 115,000

7,000

500,000 435,090 143,000 130,000

100,060.

$222,000. ~ $.230,00C.

80,000 $ 1,410,000,

Rees