we val acta

SPRUNG ‘ ca bs wah , \ aod Seth a ice URIS, 4 f

ye bet rau

PROPOSED CHANGES:

Ag this facility has a high rate of short Visits, installing a '2 Hour' parking limit on both sides of Wilson should be initiated. gee Pigure 2 and 3 for location, A 15 minute loading zone and a

handicap parking stall directly in front of the main entrance ag shown on Figure 3 should also be installed.

attach

T, i Ike de Boer Project/Traffic Technician