APPENDIX "A" attached to and forming part of the June 26, 1975 Lease proposal Horner Developments Ltd. - City of Port Coquitlam

Floor Area &

Proposal "A" Second Floor Only Lease Rate: ,

Floor Area 6600 square feet + or —

Rental: $35,376.00 - annually 2,948.00 - monthly

Proposal "B" First and Second Floors

First Floor 826 sq. ft. Second Floor 6600 sq. ft.

Total 7426 sq. ft. + or -

Rental: $40,332.00 - annually 3,361.00 - monthly

Proposal "C" First & Second Floors

First Floor 1837 sq. ft. Second Floor 6600 sq. ft.

B437 sq. ft.

$46,650.00 ~— armualiy 3,887.50 - monthly

Total Rental:

is prepared to lease the present library building (1897 sq. ft.) for a period of 5 years at an annual rental of $7,600.00 (net net net) on an "as is" basis, thereby reducing the — foregoing costs:

Horner Developments Ltd.

$35,376.00 (6,600 sq. ft.)

Proposal "A" - 7,600.00

$27, 776-00 $2,314.67

$40, 332.00 - 7,600.00

$32,732.00 $2,727.67

$:46 , 650.00 a 7,600.00

Proposal "B"

Proposal "Cc"

$39,050.00

$3,254.17

annually monthly

(7,426 sq. ft.)

annually monthly

(8,437 sq. ft.)

annually monthly