ve

THE CORPORATION OF THE try OF PORT COQUITLAM C ¢ U . N C | [ , MEMORANDUM

NOV 265 1984

TO: B. Kirk, November 21, 1984

City Administrator

“FROM: F.E. Peters., P. Eng., City Engineer

SUBJECT: Directional Signs to Minnekhada Regional Park = Works and Services Committee, November 20th, 1984

RECOMMENDATION:

install three directional signs at hed request from the G.V.R.D. to @gional Park, and that all costs be

letter from the G.V.R.D. is self explanatory.

.20T allow the installation of signs on City

There is. no Provision even for

i signs, Therefore, if Council

., agrees with the p Signs, it would be necessary

for the G.V.R.D. for the City to instal} them

as if they were We would naturally recover the costs from the G.V.R.D.

Ve BOAR A RIGO gal,

F.E. Péters, P. Eng., =

City Engineer

4

TON ees incites