152 firemen attended 210 man hours .$530 volunteers remunerations $16,500 damages

WE CORPORATION OF TUE CITY OF PORT COOQUITIAN

August 10th, 1972

Fire Desartsent Monthly Rerort for July, 1972. UJ N

house fires

cer fires AUG 1 4 1972 Sidewalk trash container ;

file of ties at C.P.R.

fire at Sunny Park Seheol play yard

bulidings teing denmolisned

erase or brusn firee

15 inhalator calis

10 rersons transported to medical aid

36 total calls siren Gounded 3 tines

OH he Ah

no firemen absent

Danege in the amount of $16,500 to two cuplexes; $1500 damage to one started froma fat fire while cooxing; $15,CCO damage to the other when fire started : - in a clothes closet and srread rapidly to the attic and roof, All the car ae

fires damages were slight.

15 inhalator calls; 2 motor vehicle accidents, 2 people transported to hospital. 2 industrial accident with one man transported to hospital. 7 home emergencies consisting of heart attacks, falls and problems with breathing. Attended a man who had an accident water skiing , a boy with a fish hook in hie finger and a : boy with a cut head received waile swimming in the river. One overdose which i required an R.C.M.P. escort to transport to hospital,

Inspections: 60 chimneys, 4 of] burners, 3 propane installations, 1 building under the halls regulations and 6O other public buildings. One order icsued under the Fire Marshal'e act.

W.5. Wingrove Fire Chief

«SW/ese

Cete LeD. Pollock : RoAc Freeman’