1 2:3 4 5 6 7 8 9

WALTON, Michael Brian 6 5793 79239) 48 15 28 6S

WRIGHT, Michael Ronald 26 249 293 253.217, 125 55-143 —-233

NOTE: Totals followed by an * indicates Candidate elected.

Ballot-paper Account

Ballot Papers Received from Printer 9,000

3 4 5 6 Z 8 9 io

Ballot-papers issued _ 1000 1300 1000 1300 500 500 500 1000

Ballot~paper Valid 753° 608 556 256 Ballot-papera Rejected . . 12 7 6 4

Ballot-papers Spoilt . : 1 - 1 -

Total Ballots Cast : 766 615 563 260 $6 Sl

Ballot-papers Missing , - ~ i Unused 534 385 737 239 144 = 482 1306 500 $00

Ballot-papers

Total Ballots 1000 Ballot-papers Unissued

Total Batlots

3.___Voting for ‘Regional Board Director

~ For a term coincident with the elected Director's term as Hayor; 1 to be elected

i 2 3 4 5 6 7 8 9 10

CAMPBELL, Jack Marshall 59__421 415 332 375 136 98 225

PRANTE, Heinrich Ernst Ferdinand 11-64 84 90 50 25 12 32

WEST, Frederick Thomas 21178 251 (185 (130 96 43 94

NOTE: Totals followed by an * indicates Candidate elected. Ballot~paper Account . Ballot ‘Papers Received from Printer 9,000 3.4 5 6

Ballot-papers issued oe 209 1000 1300 1990 $00 500 Ballot-papers Valid , 750 607 555 257 Ballot-papers Rejected ) 15 8 4 Ballot-papers Spoilt

Total Ballota Cast

Ballot-papers Misaing

‘Ballot-papers Unused 156

Total Ballota oo "500 500 S00. 200 Ballot-papers Uniseued

Total Ballots