Hannes

Preparing accurate as-built drawings. upon completion of the Wor ks ;

noy employ on the Works any person who, in the opinion of the City Engineer [s unfit or not skilled tn the work assigned to him, and the Developer, in connection with the execution of the Works, will Keep and employ a competent site superv [sor capable of speaking, reading and writi ing the English language, and any explanations, orders, Instructions, directions and requests given” by The City Eng ineer to the site supervisor shal | be deemed te. have been given to the Developer; and

at its own expense modify, reconstruct and ‘reinstall. all Works TO" the: sati sfaction. of the Ci ity Engineer that are manufactured, installed or constructed In any: way that Is detective or such

that they: do not operate to the satisfaction of the. city Engineer

prior to completion, the satisfaction of the. city Eng ineer belng conclusively evidenced by a ‘certificate of Completion signed by

the City Engineer.

the ‘Developer shall complete the construction and | installation of the Works to the satisfaction of the City. Engineer as certified by. him in writing ina Certificate of Campletion, » by 12:00 am,

“December 31, 19385 for that part of the Works descr ibed by

Sections Bad, 3(b), 3c), 3(e) and by March 3, 1986 for that

part. of the Works des cribed by Section: 3(d); and

aS

ere City Engineer may in his. discretion issue a Certificate of

aoe

eee ie es

Completion: for. a portion ‘of the Works.

Upon completion of the’ Works the Developer covenants and agrees, at

its. own expense to: