/6. March 24th, 1980.

“PWC, Mar. 19/80 From the Public Works Committee, March 19th, 1980 recommending that

:ve Dairy Queen

‘Landscaping. the Dairy Queen be allowed to undertake the construction of a landscaped seating area on the sidewalk space on Whyte Avenue outside the Dairy

Queen.

Moved by Alderman Mabbett:

Seconded by Alderman Traboulay:

That as recommended by the Public Works Committee, Merch 19th, 1980 the Dairy Queen be allowed to undertake the construction of a landscaped seating area on the sidewalk space on Whyte Avenue outside the Dairy Queen subject to the conditions as outlined in the report;

AND THAT the City Engineer be authorized to issue a permic.

Carried. Prior to passage of the foregoing resolution Alderman Mabbett stated he is in favour of the application as long as the City has a good contract with Dairy Queen to keep the area clean. “PWC, Mar. 19/80 From the Public Works Committee, March 19th, 1980 regarding a re Loading Zone ~ Gomm. Hotel. loading zone in front of the lobby of the Commercial hotel and recommending that a 15 minute loading zone be installed directly in front of the entrance to the lobby of the Commercial Hotel on Flint Street extending

from the driveway to 9 m south.

Moved by Alderman Mabbett:

Seconded by Alderman Traboulay:

That as recommended by the Public Works Committee, March 19th, 1980 a 15 minute loading zone be installed directly in front of the entrance

to the lobby of the Commercial Hotel on Flint Street extending from the

driveway to 9 m south.

1

“PWC, Mar. 19/80 From the Public Works Committee, March 19th, 1980 recommending that ‘re GVS&DD R/W. the Right-of-Way Agreement for the Greater Vancouver Sewer and Drainage District's sewer be approved; and that His Worship the Mayor and the City Clerk be authorized to sign the Agreement on behalf of the

City and affix the Corporate Seal thereto.

Moved by Alderman Mabbett:

Seconded by Alderman Traboulay:

That as recommended by the Public Works Committee, March 19th, 1980

the Right-of-Way Agreement for the Greater Vancouver Sewer and Drainage

District be approved;