“Nature ‘Area Dedication By-law,” 1973, No. 1281" allot-paper a _ Account - ~ cont! d. St.Catherine's Viscount Cedar. Mary. Hill

ST 7 Anglican Church ‘Alexander Drive Elementary

_ Advanced Hall School | - School School TOTAL

November 19th, 1973.”

Total Ballots Cast’ p56. | go fag | 681 _ | 3696

“Ballot-papers Unused |: 44 [> 752.- | 186 | gi9 |} | 2404

Total Ballots. . § 2000 FS | 3500 Ju500 | 2500.) 6100 : oe : Baliot-papers Unissued. ~~ 2900 Total Ballots - 9000

A total of 3, 692 Owner and Resident Electors out of 10, 114 eligible to cast -

ballots for Mayor: and Aiderman actually voted, for. a percentage turnout of 36.55%, “-(Sed) 'R\A. Freeman' R. A. Freeman, ‘Returning Officer."

Moved by Alderman Laking:

Seconded by Alderman Meyer: | | That ‘the report of. the Returning Officer, November 19th, 1973, setting forth the results of, the Annual Municipal Hlection held in the City of Port Coquitlam, November 1 i?th, 1973, be received. oe 7 a Carried. Alderman Ranger, referral to. the % bus ‘stop located in front of the Port Ald. Ranger

-re bus stop Coquitlan Bowladrome near ‘the North-east corner of HeALlister Avenue and the lane at PC Bowla

-drom.on

' access; and he suggested that the Public: Works Committee should investigate the McAllister.

. co oe oo . . Avenue potentiaily. hazardous situation of buses biocking the view of motorists entering

eu: Avenue from the lane. -

, Alderman Ranger stated he felt that, a _écent ‘traffic fatality caused by. a Ald. Ranger

re direc-~ : motorist naking a left-turn from _the Lougheed Highway onto Colony: Farm Road at tional left

~turn sig- _Riverview may have been avoided had a left-turn directional arrow signal been nai -Loug heel

installed at the intersection, and requested that the Public | Works Committee in~ Toa Read vestigate ‘the situation with a vidw: ‘to forwarding his ‘suggestion to the Provincial

Department ‘of agers for’ consideration. “ Mlderma a Mabbett pointed out that there

“is exactly the same situation ; at the ‘Lougheed ighway-Shaughnessy Street” inter-

section, “and al though a 1ést-turn directional attow has been requested on several

occasions, | no action has as “yet ‘been taken by the Department to have such a sig-

nal. installed at that location. | |

| Alderman Mabbett referred to his’ suggestion at the Public Hearing held ear- . Ald.¥ Mabbett

re sprinkl- “Ler this ‘evening that: frame apartments, such: as condowiniums, be required to _ ing systems

~frame apts have’ sprinkling systems: instalied as a fire safety measure. Alderman Thompson oO : stated his view that resister fire wall breaks would be as effective; however, the Fire Chief pointed out that the ‘installation of séparation walls is presently required in multiple dwelling units. Aiderman ‘Laking stated he felt that fire walls should be 8-inch conerete block between each unit “in condominiums, and the

following resolution was propused :