Tae panulacturiug and repairing of the Ha ee ee On phew as .

PS .e - : . _ , : following CU ACA ©. a

4. electric motors and #lectson: Provided that the to those items not

elee rical and electronic equipeents

fe equipecnt, sanufacturing is Hiaited over 2000 pounds in weight.

The wanvfacturing, procezeing or finishing of the following fwa-netallic mineral products: oe . . ; , i. articles froa prepared abrasives, STAD NO de Se on 2.

iL. articles fron prepared asbestos, =m vee . :

ait. giaas and glass produces. t CIALP CASTE WIG S oo . ; a . . . . iv. pottery and ceranics, Avarzane - Seu MATS MOB ¥. stone ronseents, a ns : Jt , . 7 G) The manufacturing, processing or packaging cf nar bed : . mo. on : . Wo C-UGHUG - an a : _ ‘ . cyt : f the folloving chenfeals end @llited products: he f, A: oe : 7 : a —_ . . alcohol. . 2 Al Alco on . ’ : ye . teas ; , . aye stuffs. i. Kenos ron) G 2 oY . ” . , - a : H inert coupressed gases. ” yt o- a paints, varnishes and lacquers. pao i . S “EG late La 1p a7 rin. baore T : ve 7 . . ; photographic chenicsls and film. Bes WTA ‘a 6c AL mos Lot ae ars ; 7 . pucey, caulking conpounds and gictiar products. Dn am G es re : : an . . Vesa EEG. : Dad Meee a yt

Soaps, detergents, cleaniog and polishing preparations.

oo QQ oO 2 0

aH 5

eS gS &

an s .S)

v SO 6 Oa oO

9 ‘ &

gs

i

u Ny

u

x ®

*O

2 a.)

INS) GQ ¢ re

oa L%) e i)

uh © Sy

soda _conpounds

Lee. equen. “TA te (NTER,

Ck} Public utility buildings and installations buck

as teleghone exchanges, transformer stations PRE OT Sd . 7 : - Ds and public works yards.

t mine " ae . . : Reaetas de a an

Accessory buildings and ses, including the : . internal disptay, ioternsi storage and {atern:] wm ge J . , STUVE GE

fatail sale of goods produced of stored on the cacosove - so -

Prenises,

4iw

rn

fou Liss. One “3 p

td

Prars eo. Was en.

-engos

rai

ete

CAR Pvecsee fae

oWhutus 6. Lees lyuse.

(2) Conditions of Use:

(s)

Lot Area and Width

Each lot shall have an area of not less thaa 20,000 scuare feet and @ width of not less than 100 feet, except vhere such lot vas exfsting st the effective date of thie By-lav,

Lot Coverage ang Butidin Size

Buildings and etructures Cogether shail not

.Sxceed @ lot coverage of 60 percent end the cine

imum gross floor ares of « principal building shall : be 1500 square feet.