CE QUE VOUS DEVEZ SAVOIR SUR LE BUNGEE

Vivez les 30 secondes les plus excitantes de votre vie — mis a part votre permier baiser! Faites le saut de langeen bungee.

L’origine du bungee

Le bungee est originairede Meélanésie, un archipel du sud-ouest du Pacifique. Autrefois, au cours de cérémonies d’ initiation qui devaient permettre aux adolescents de devenir des hommes, les jeunes s’élangaient du haut d’une tour de bambou de plusieurs étages, les pieds attachés aune vigne. Ils devaient alors bien évaluer leurs sauts pour toucher le sol de leur téte sans se blesser.

Pour faire le grand saut

Lebungee estuneactivité de courte durée, mais trés intense. Aprés l’inscription, il faut escalader une tour d’au moins 43 m(140 pi). Une personne qualifiée attend le téméraire en haut pour lui donner lesconsignes, attacher ses pieds al’ élastique etl’ encourager a sauter.

Différents sauts sont possibles, selonle choix du participant. Les moins recommandés sont le saut debout — n’ oubliez pas que vous étes attaché-e par les pieds — et les pirouettes, puisqu’il est possible de heurter l’élastique. Le plongeon est le saut le plus souvent pratiqué. Toutefois, le saut le plus intéressant pour les amateurs de lasensation de chute libre est le saut de l’ange, un plongeon ou ons ’élance vers P avant en gardant les bras ouverts le pluslongtemps possible.

Qui peut faire du bungee? Presque tout le monde peut essayer le bungee. On exigeun poids minimum

de 36 kg (80 Ib) et un poids maximum de 109 kg (240 Ib). Les participant-es doivent étre agé-es de 18 ans ou plus, ou étre accompagné-es d’un parent autorisant le saut. Il nefaut pas avoir de problémes de santé, en particulier des problémes cardiaques ou de dos. L’apparition d’une coloration bleu-rouge sur la partie supérieure du corps aprésle saut est tout a fait normale puisqu’on est pendu par les pieds et que le sang se trouve concentré a la téte et au

tronc. Au bout de quelques minutes, la circulation se rétablit.

Les régles de sécurité

Les centres de bungee disposent de différents élastiques, congus en

fonction du poids des | participant-es. Unharnais | [~~

permet d’y attacher les deux pieds.

L’élastique est fait de nombreuses_ bandes élastiques (de 900 a 2,200) et il est vérifié a lusine avant d’ étre utilisé.

Chaque élastique est

congu pour supporter dix fois le poids maximum indiqué. Par exemple, l’élastique congu pour un poids de 82 kg (180 Ib) peut supporter un poids

-8-

de 820 kg (1,800 Ib). Il est fabriqué pour pouvoir s’étirerjusqu’a dix fois salongueur normale.

Par ailleurs, |’amateur de bungee doit signer un document de renonciation a toute poursuite, document qui dégagela compagnie de toute responsabilité en cas de blessure ou de décés relatifs a cette activité — qui comporte toujours un certain risque— amoins qu’ il nes’ agisse d’une négligence del’ établissement.

Notez que les régles de sécurité sont trés strictes et approuvées par la Régie dela sécurité dans les sports, qui contréle les centres offrant les sauts en bungee. Entre autres, laréglementation exige que chaque élastique soit détruit aprés 150 sauts.

LE GRAND SAUT

Hauteur de la tour a partir de la grue: de 30 a 45 m (de 100 a 150 pi) Hauteur de la tour: 21 m (70 pi)

Q

7\\ Saut typique

| 1. Au cri du guide “3-2-1, bungee”, le sauteur s’élance dans le vide.

¥ }\} 2. Le sauteur descend a une vitesse de

35 km/h (22 mi/h), Pélastique retenant

la chute de 15 4 45 cm (de 6 4 18 po) du coussin d’air

ou de l'eau.

3. L’élastique se raidit, ramenant le sauteur a une hauteur corres- pondant a 93% de la hauteur originale du saut.