THE CORPORATION OF THE CITY OF PORT COQUITLAM “SOIL DEPOSIT REGULATION BYLAW NO. 2665"

SCHEDOLE “B”

ASSURANCE OF GEOTECHNICAL DESIGN FOR SOIL DEPOSIT AND COMMITMENT FOR FIELD REVIEW

Date

City Engineer

City of Port Coquitlam 2580 Shaughnessy Street Port Coquitlam, B.C. V3C 2A8

Dear Sir:

Re: Application for Soll Deposit Permit

at

civic address

I, the undersigned registered professional engineer/landscape architect hereby give assurance that the design, location, quality, nature, depth, volume and configuration of the soil to be deposited and works to be constructed and undertaken in support of and in relation thereto all as shown on the plans and supporting documents prepared and signed by me and attached to this letter are consistent with sound reasonable engineering fill and soil deposit practice, and when and if carried out in conformance with such plans and specifications will not constitute any reasonably foreseeable risk or hazard to persons or property.

I undertake to conduct such supervision, testing and field review to ensure that the deposit of soil substantially complies with the plans, specification and supporting documents attached hereto.

I assure you that I have been given the authority by the owner of the lands on which the soil is to be deposited and by the applicant for the permit (if different from the owner) to stop, remove or redirect the deposit of soil as required in my judgment and as required to comply with the plans, specifications and supporting documents attached hereto. .

I will notify you in writing immediately if my contract for field review, testing, or supervision is terminated or limited at any time before the completion of the deposit of soil and works described in the plans, specifications and supporting documents attached hereto. .