SUMMARY:

1000.00 to allow is my recommendation the in two years maximum rather than ears ($5,000.00 per year) thus avoiding

If further funds are not avai should delay until next ; : combined with The i first

of eted in the second year.

Of course .these recommendations are Secondary to the work being completed in one year should tunds be available. ‘ ;

Thank you,

‘ 7

wees LF wee Doug Madden, Senior Fire Prevention Officer, Port Coquitiam Fire Department.

(TTS anna Seid ici, Rina IC AE ecb aR Asin pontine aN are eaten TOME tea SA Ue ahad alveten deve sine

AR GENS Ne roteah ete

RSET RIO Mae peat Be ne

AP MANE New

PRIN,