Financement de votre investissement dans les économies d’ énergie

Au moment de déterminer les aspects financiers du programme d’économies d’énergie pour votre maison, il est important de considérer le montant de la subvention qui peut vous étre versé en vertu de programmes du gouverne- ment du Canada et, dans bien des cas, du gouvernement provincial.

Le gouvernement du Canada a mis sur pied deux importants programmes afin d‘aider les propriétaires de maisons en ce qui a trait a l'énergie: il s‘agit du Programme d'isolation thermique des résidences canadiennes (PITRC) et du Programme canadien de remplacement du pétrole (PCRP). Si vous participez a ces deux programmes, vous pouvez éco- nomiser jusqu’a 1 300 $ sur les frais d‘amélioration du rendement énergé- tique de votre maison.

Grace au Programme d’ isolation ther- mique des résidences canadiennes, 1,7 million de maisons canadiennes sont maintenant mieux isolées Le PITRC verse des subventions impo- sables, allant jusqu’a 500 $, pour couvrir les coits des matériaux et de la main-d'ceuvre nécessaire a ]'isolation et au calfeutrage d’une habitation.

Pour étre admissible, votre maison ou votre immeuble a logements multiples doit

étre une résidence principale ou un foyer d'hébergement sans but lucratif, compren- dre trois étages au plus et avoir été cons- truit avant le 1° janvier 1971. Au Yukon, dans les Territoires du Nord-Ouest et a Terre-Neuve, les logements construits avant le 1°" septembre 1977 sont admis- sibles aux subventions du PITRC. Il en va de méme pour les logements de la Nouvelle-Ecosse et de l'Tle-du-Prince- Edouard qui ont été construits avant le le janvier 1977.

Pour obtenir plus de renseignements, communiquez avec le bureau du PITRC de votre région (les numéros de téléphone se trouvent en page 15).

Le Programme canadien de remplace- ment du pétrole...c’est peut-étre ce qu’il vous faut

Le PCRP verse des subventions imposables aux propriétaires de maisons et aux en- treprises qui modifient leur systeme de chauffage afin d’utiliser un combustible autre que le mazout. Les substituts admis- sibles varient selon les régions, mais comprennent généralement le gaz naturel; l'électricité, le bois, la chaleur solaire et le propane.

Les subventions du PCRP couvrent la moitié des coiits admissibles des matériaux et de la main-d’oeuvre qui sont engagés lors de la conversion de systémes de chauf- fage, jusqu’a un maximum de 800 §$, pour les habitations unifamiliales. Les conver- sions du systeme de chauffage central

d'immeubles a logements multiples com- prenant au moins deux logements auto- nomes peuvent, dans certaines circonstan- ces, étre admissibles a une subvention pouvant aller jusqu’a 5 500 §, selon le nombre de logements.

Le PCRP est adapté aux besoins desCanadiens _ i

A Terre-Neuve, a I'Ile-du-Prince-Edouard, au Yukon et dans les Territoires du Nord- Ouest, le PCRP offre des subventions maxi- mums de 800 $ non seulement pour les conversions de systémes de chauffage, mais aussi pour les travaux visant a permettre des économies d’énergie. Les projets d’économie d’énergie couverts par la subvention comprennent la réduction des fuites d’air, l'isolation et l'amélioration des systémes de chauffage au mazout. Les travaux visant a améliorer l'étanchéité et l'isolation doivent étre effectués par un entrepreneur inscrit auprés de l'ONGC.

Propriétaires et locataires sont admissibles aux subventions du PCRP Sont admissibles aux subventions du PCRP les propriétaires de maisons, les proprié- taires de logements et les locataires dont les propriétaires consentent a ce qu’ils entreprennent la conversion 4 leurs frais. Pour obtenir plus de renseignements, com- muniquez avec le Bureau des économies d’énergie et des énergies renouvelables de votre région (les numéros de téléphone se trouvent en page 14).