B.R. Kirk DATE: July City Administrator

N. Chernoff Director of Building

Permits and Inspections

Covenant for 1078 Yarmouth Street, Port Coquitlam

RECOMMENDATION:

That the covenant be approved for installation of Sewage pump.

BACKGROUND AND COMMENTS:

The above captioned dwelling had to be lowered to create a more favourable grade with adjoining subdivision, In lowering the grade access to the Sanitary sewer system by gravity became impossible. A Sewage pump has been installed to facilitate installing a washroom on the lowest floor level. Solution chosen has been the only alternative available to complete the

project.

Yours trul

“ey

ZEEE

ick Chernoff,

NC/vrm

Attachment