satin. Myr pe mre” Vet ew wer heat a . ‘ . ig ees Teg h adie te Parents 6" . on > ceed NED EDIE Le BELL SITES, FETE Esa te viea ce ne teenie nee ce cancuannnay OE HCAS EEE VRE DURES SEE OF TERS OM Hd ae ater cn teen poe ae peect PERONEAL SO hee tn

2. - Voting for Alderman

- 6 to be elected -~ 3 year term

l 2 3 4 5 6 7 8 3g 10 BOWLER, J.G. 66 162 190 194 172 88 81 106 202 210. BROOKS, K.E. 115 316 347 410 214 150 200 129 335 446 CURTIS, C.K. 107. 317 329 337 281 176 161 150 3/74 403 *GATES, M.D. 145 485 542 593 309 249 268 i31 416 603° *CORDON, M.J. 104 339 331 412 270 181 172445421 *KERYLUK, J.J. 131 434 434 451 275 224 182405 463 “STEWART, WoW. 104 346 342 415 225 149 169 129 305 443 *TALBOT, R.H. 142 573 460 542 344 210 256 204 404 532 THOMPSON, M.A. 112 319 3868 409 274 134 i77 354 533 WESTRAND, G.S. 80 272 319 347 234 150 134 266 309 *#WRIGHT, M.R. | 156 476 515 603 342 228 275 186 499 648

NOTE: Total followed by an * indicates Candidate elected.

Ballot-paper Account

Ballot Papers Received from Printer ~ 14000

| 1 2 3s 4 5S 6 7 8 9 10 Ballots Issued 300 1000 1000 1100 1000 700 700 1000 1000 1100 Ballots Valid 254 812 823 968 557 “422 316 809 980 Ballots Rejected 5 18 13 5 7 6 7 19 Ballots Spoilt 0 0 1 a) ) 1 0 Ballots Missing 0 1 0 0 ) 1 14 Ballots Unused 41 169 163 122 271 6/8 i162 87

Total Ballots 300 1000 1000 1100 : 700 1000 1000 1100 400

Ballot-papers Unissued Total Ballots

ITEM | PAGE

7 17