a Agee Cats

WAG

Trade, technical, professional and vocational schools;

Offices used by municioal, provincial or federal governments, utility companies, engineers, surveyors, architects, and landscape architects;

Auction rooms; Accessory offices to uses permitted in this zone; provided that such offices are located in the same building as the principal use and do not occupy more than 60% of the gross floor area of that building.

(j) Accessory off-street parking and accessory Loading.

SITING OF USES

All permitted uses, other than accessory off-street parking and accessory loading, shall be completely enclosed within a building.

ACCESSORY RETAIL SALES

Sales and display ereas for a retail sales use accessory to a wholesale warehouse use shall be located in the principal wholesale warehouse building and shall not exceed 202% of the gross floor area eccupled by the business carrying on the wholesale warehouse use.

MINIMUM AREA ~ OFFICE USES

Office uses permitted by Subsection (2)(g) shall occupy a minimum of 550 m@ (5,920 aq. ft.) of floor area for each agency or business.

HEIGHT OF BUILDINGS

The height of any principal building shall, not exceed 12 m (39.4 ft.). Accessory buildings shall not exceed 6 m (19.7 ft.) in height.

FLOOR AREA RATIO

The maximum permitted floor area ratio is 1.0, provided that where required off-street parking is located underground or within a structure, the maximum floor area ratio shall be increased by the proportion of the required parking so provided, multiplied by 0.6, to a maximum floor area ratio cf 1.6.

LOT COVERAGE

All buildings and structures together shall not occupy more than 50% of the surface of the lot.

SI nF

7

ers