MITEL SX-100 C.P.B.X.

Single Payment 5 Plan Year

$ $ Mitel SX-100 340.00 239.00 200.00 177.00 65.00

Trunk Card (3) (9 Trunks) 100.50 70.50 60.60 52.50 8.25

Line Card (7) (50 Stations) 196.00 138.25 115.50 101.50 19.25

TOTAL TIER A 636.50 447.75 375.50 331.00

TOTAL TIER B 92.50 92.50 92.50 92.50 | trunk .2—Way. (3) 193.50 193.50 193.50 193.50 Trunk In (3) f 189.75 189.75 189.75 — : 189.75 Trunk Out (3) 189.75 189.75 189.75 189.75

‘Stations (34) | 98.60 93.60 98.60 98.60

Stations (14)

Ancillary Equipment 235.95 _ 235.95 — 235.95 235.95

RENTAL PER MONTH 1,000.05 1,636.55 1,447.80 1,375.55 1,331.05 PRESENT RENTAL 1,542.95 1,542.95 1,542.95 1,542.95 1,542.95 OLPFERENCE ~ 542.90 +93.60 - 95.15 ~ 167.40 ~ 211.90

TITAL INSTALLATION 2,277.00

7) ADD TOUCH CALLING THE FOLLOWING RATES WOULD APPLY: $1.00 per month for each telephone

Change sets from rotary dial to touch calling on single line sets charge is $15.00 for the first and $5.00 for each additional set. Change out 3-5-9 line sets is $26.00 each.