ati ieee

‘ perea ees EGE seitides ihe

Hag

BAKER M°GARVA HART

1024 Mainland Street, Vancouver, British Columbia V6B 2T4 Telephone (604) 683-1024

KILMER HOUSE Port Coquitlam, British Columbia

QUANTITY SURVEY by Clive Evans Reg.Q.S. From an examination of the property on November 20, 1986, with Susan Baker Architect (Baker McGarva Hart) and C.¥.Loh P.Eng,

OPTIONS FOR FULL UTILITY OF ALL THREE FLOORS

A 1} RAISE HOUSE ($3,500-4,000) $7,000.00 includes connections, extend chimneys, new wall area, fire separation from main floor (2 layers drywall) and two doors

B 2) RAISE AND MOVE HOUSE 40 ft. north onto the $27,000.00 three corner lots fronting Pooley Ave. -includes connections, new foundation and concrete slab, -extend chimneys, relocate boiler/water tank, new fire- separation from main floor, two doors and window.

GENERAL UPGRADING OF BUILDING

3) SW PORCH: Lift and replace footing $1,000.00

4) EXTERIOR UPGRADING: ~Renovate Front Porch $13,600.00 ~Strap Chimney ~Redecorate Exterior Siding -~New Exterior Stair to 2nd floor -Wheelchair ramp at rear entrance -~Allow for some window. hardware

Meat oo _ ; . - ; _ ° Ts

-Re-shingle main‘ roo: “siirface: pee Oe | a $4;500.00° -Replace front porch roof stifface and flashings -Replace and extend downpipe

INTERIOR DIVISION: $5,000.00 ~Half glazed screen (fire separation) top main stair

-Two new doors

-New partitions for handicapped W.C., 2nd floor W.C.s,

and new doors,

7) Miscellaneous repairs vertical movement (main Stair) $500.00