2.3 Site Lighting

Site lighting is to be designed to provide adequate levels of illumination, for both safety and security.

Throughout the Port Coquitlain Home & Business Centre site lighting will use a uniform fixture mounted at a uniform height. This fixture will be Lithonia KKR Post-top Luminaire with black finish.

Illumination of buildings must be done in away that the lamps are not visible from the adjacent streets.

Illumination of eatry signs is to be provided by light source concealed in landscaping - See Section

Pathway illumination is : »y bollard

Lot Luminaire KKK Post—Top

in ide Lamp

Parking Lot Lighting

Partd: Lot enineion

Cersne waintenrers, Stock Fintan Mete!-Hetes Lamp

= =C

LE— Conerste aace

Storage/Loading Lighting

PCI Group Christopher Bozyk Architects Ltd.